---
layout: api
page_title: /sys/key-status - HTTP API
sidebar_title: <code>/sys/key-status</code>
description: |-
  The `/sys/key-status` endpoint is used to query info about the current
  encryption key of Vault.
---

# `/sys/key-status`

The `/sys/key-status` endpoint is used to query info about the current
encryption key of Vault.

## Get Encryption Key Status

This endpoint returns information about the current encryption key used by
Vault.

| Method | Path              |
| :----- | :---------------- |
| `GET`  | `/sys/key-status` |

### Sample Request

```shell-session
$ curl \
    --header "X-Vault-Token: ..." \
    --request GET \
    http://127.0.0.1:8200/v1/sys/key-status

```

### Sample Response

```json
{
  "term": 3,
  "install_time": "2015-05-29T14:50:46.223692553-07:00",
  "encryptions": 74718331
}
```

The `term` parameter is the sequential key number. `install_time` is the
time that encryption key was installed. `encryptions` is the estimated
number of encryptions made by the key including those on other cluster
nodes.
