---
layout: docs
page_title: OIDC Provider Setup - Auth Methods - Auth0
description: OIDC provider configuration for Auth0
---

## Auth0

1. Select Create Application (Regular Web App).
1. Configure Allowed Callback URLs.
1. Copy client ID and secret.
1. If you see Vault errors involving signature, check the application's Advanced > OAuth settings
   and verify that signing algorithm is "RS256".
