### Lease Count Quota Invalidations on DR Secondaries Fixed

Lease count quota invalidation causes DR Secondaries to panic and experience
a hard shutdown. This issue exists prior to Vault 1.6.6 and 1.7.4. It is
fixed in Vault 1.6.6, 1.7.4, and 1.8.0.
