### Large raft snapshots

Taking and restoring Raft snapshots can exceed Vault's default and recommended
timeout settings. The
[`VAULT_CLIENT_TIMEOUT`](/vault/docs/commands#vault_client_timeout) environment variable can
be used to allow for more time to take or restore a snapshot.
