---
layout: docs
page_title: 'Commands: operator raft list-peers'
sidebar_title: raft list-peers
description: |
  Display the current Raft peer configuration.
---

# Command: operator raft list-peers

The Raft list-peers command is used to display the current Raft peer
configuration.

See the [Outage Recovery] guide for some examples of how this command is used.
For an API to perform these operations programmatically, please see the
documentation for the [Operator] endpoint.

## Usage

```plaintext
nomad operator raft list-peers [options]
```

If ACLs are enabled, this command requires a management token.

## General Options

@include 'general_options_no_namespace.mdx'

## List Peers Options

- `-stale`: The stale argument defaults to "false" which means the leader
  provides the result. If the cluster is in an outage state without a leader, you
  may need to set `-stale` to "true" to get the configuration from a non-leader
  server.

## Examples

An example output with three servers is as follows:

```shell-session
$ nomad operator raft list-peers
Node                   ID               Address          State     Voter
nomad-server01.global  10.10.11.5:4647  10.10.11.5:4647  follower  true
nomad-server02.global  10.10.11.6:4647  10.10.11.6:4647  leader    true
nomad-server03.global  10.10.11.7:4647  10.10.11.7:4647  follower  true
```

- `Node` is the node name of the server, as known to Nomad, or "(unknown)" if
  the node is stale and not known.

- `ID` is the ID of the server. This is the same as the `Address` but may be
  upgraded to a GUID in a future version of Nomad.

- `Address` is the IP:port for the server.

- `State` is either "follower" or "leader" depending on the server's role in the
  Raft configuration.

- `Voter` is "true" or "false", indicating if the server has a vote in the Raft
  configuration. Future versions of Nomad may add support for non-voting servers.

[operator]: /api-docs/operator
[outage recovery]: https://learn.hashicorp.com/tutorials/nomad/outage-recovery
