---
layout: docs
page_title: restart Stanza - Job Specification
sidebar_title: restart
description: The "restart" stanza configures a group's behavior on task failure.
---

# `restart` Stanza

<Placement groups={['job', 'group', 'restart']} />

The `restart` stanza configures a group's behavior on task failure. Restarts
happen on the client that is running the task.

```hcl
job "docs" {
  group "example" {
    restart {
      attempts = 3
      delay    = "30s"
    }
  }
}
```

## `restart` Parameters

- `attempts` `(int: <varies>)` - Specifies the number of restarts allowed in the
  configured interval. Defaults vary by job type, see below for more
  information.

- `delay` `(string: "15s")` - Specifies the duration to wait before restarting a
  task. This is specified using a label suffix like "30s" or "1h". A random
  jitter of up to 25% is added to the delay.

- `interval` `(string: <varies>)` - Specifies the duration which begins when the
  first task starts and ensures that only `attempts` number of restarts happens
  within it. If more than `attempts` number of failures happen, behavior is
  controlled by `mode`. This is specified using a label suffix like "30s" or
  "1h". Defaults vary by job type, see below for more information.

- `mode` `(string: "fail")` - Controls the behavior when the task fails more
  than `attempts` times in an interval. For a detailed explanation of these
  values and their behavior, please see the [mode values section](#mode-values).

### `restart` Parameter Defaults

The values for many of the `restart` parameters vary by job type. Here are the
defaults by job type:

- The default batch restart policy is:

  ```hcl
  restart {
    attempts = 3
    delay    = "15s"
    interval = "24h"
    mode     = "fail"
  }
  ```

- The default service and system job restart policy is:

  ```hcl
  restart {
    interval = "30m"
    attempts = 2
    delay    = "15s"
    mode     = "fail"
  }
  ```

### `mode` Values

This section details the specific values for the "mode" parameter in the Nomad
job specification for constraints. The mode is always specified as a string

```hcl
restart {
  mode = "..."
}
```

- `"delay"` - Instructs the scheduler to delay the next restart until the next
  `interval` is reached.

- `"fail"` - Instructs the scheduler to not attempt to restart the task on
  failure. This is the default behavior. This mode is useful for non-idempotent jobs which are unlikely to
  succeed after a few failures. Failed jobs will be restarted according to
  the [`reschedule`](/docs/job-specification/reschedule) stanza.
